[[webflux-http2]]
= HTTP/2
:page-section-summary-toc: 1

[.small]#xref:web/webmvc/mvc-http2.adoc[See equivalent in the Servlet stack]#

HTTP/2 is supported with Reactor Netty, Tomcat, and Jetty. However, there are
considerations related to server configuration. For more details, see the
{spring-framework-wiki}/HTTP-2-support[HTTP/2 wiki page].
